10^{-3} 10^{-2} 10^{-1} 10^0 50 45 40 35 30 25 20 15 10 5

Etot(Z) / Etot(0-)

Depth [m]

Type I Type IA Type IB Type II Type III c = 0.02 c = 0.1 c = 0.2 c = 0.5 c = 2.0